/* Copyright (C) 2006, 2007, 2008 Free Software Foundation, Inc.

This file is part of GCC.

GCC is free software; you can redistribute it and/or modify it under
the terms of the GNU General Public License as published by the Free
Software Foundation; either version 3, or (at your option) any later
version.

GCC is distributed in the hope that it will be useful, but WITHOUT ANY
WARRANTY; without even the implied warranty of MERCHANTABILITY or
FITNESS FOR A PARTICULAR PURPOSE.  See the GNU General Public License
for more details.

You should have received a copy of the GNU General Public License
along with GCC; see the file COPYING3.  If not see
<http://www.gnu.org/licenses/>.  */

/* This file contains the definition of the named integer constants provided
   by the Fortran 2003 ISO_FORTRAN_ENV intrinsic module.  */

/* The arguments to NAMED_INTCST are:
     -- an internal name
     -- the symbol name in the module, as seen by Fortran code
     -- the value it has
     -- the standard that supports this type  */ 

NAMED_INTCST (ISOFORTRANENV_CHARACTER_STORAGE_SIZE, "character_storage_size", \
              gfc_character_storage_size, GFC_STD_F2003)
NAMED_INTCST (ISOFORTRANENV_ERROR_UNIT, "error_unit", GFC_STDERR_UNIT_NUMBER, \
              GFC_STD_F2003)
NAMED_INTCST (ISOFORTRANENV_FILE_STORAGE_SIZE, "file_storage_size", 8, \
              GFC_STD_F2003)
NAMED_INTCST (ISOFORTRANENV_INPUT_UNIT, "input_unit", GFC_STDIN_UNIT_NUMBER, \
              GFC_STD_F2003)
NAMED_INTCST (ISOFORTRANENV_IOSTAT_END, "iostat_end", LIBERROR_END, \
              GFC_STD_F2003)
NAMED_INTCST (ISOFORTRANENV_IOSTAT_EOR, "iostat_eor", LIBERROR_EOR, \
              GFC_STD_F2003)
NAMED_INTCST (ISOFORTRANENV_NUMERIC_STORAGE_SIZE, "numeric_storage_size", \
              gfc_numeric_storage_size, GFC_STD_F2003)
NAMED_INTCST (ISOFORTRANENV_OUTPUT_UNIT, "output_unit", GFC_STDOUT_UNIT_NUMBER, \
              GFC_STD_F2003)
